LIBRARY portaudio_x86.dll
EXPORTS
Pa_Initialize
Pa_GetDeviceInfo
Pa_GetErrorText
Pa_OpenStream
Pa_OpenDefaultStream
Pa_GetStreamInfo
Pa_CloseStream
Pa_Terminate
Pa_StartStream
Pa_StopStream
Pa_AbortStream
Pa_IsStreamActive
Pa_GetDeviceCount